30 years of experience with CEA

Prices list 2017

• Seismometers:  for 30 years

• Microbarometers:  for 20 years

Microbarometer digital MB3d | 1 | 2 | 3 | 4 | from  5 to 9 | from 10 to 19
PR000154-ASM | 13,500 | 13,390 | 13,250 | 13,130 | 12,980 | 12,570

Microbarometer analog MB3a | 1 | 2 | 3 | 4 | from  5 to 9 | from 10 to 19
PR000153-ASM | 9,740 | 9,630 | 9,520 | 9,400 | 9,300 | 8,655

CAPS

| Set of 4 caps / Price per set | 1 | 2 | 3 | 4 | from  5 to 9 | from 10 to 19
SW000004-TLS | Temporary MB3 nozzle caps | 6 | 6 | 6 | 6 | 6 | 6
PR000354-ASM | Permanent MB3 nozzle caps | 820 | 820 | 820 | 820 | 368 | 299

lenght in meter

CABLES

|  | 1.5 | 3 | 5 | 6 | 10
PR000187–CBL | MB3a Power cable |  | 265 |  | 275 | 285
PR000399-CBL | MB200x Power cable |  | 295 |  | 305 | 320
PR000397-CBL | Ground cable |  | 97 |  | 107 | 117
PR000183–CBL | GPS cable |  |  | 155 |  | 180
PR000188-CBL | PC/USB cable | 260 | 275
PR000161-CBL | MB3a to digitizer cable |  | 295 |  | 305 | 320
PR000373-CBL | MB3a to SMAD digitizer |  | 570 |  | 585 | 600
PR000302-CBL | MB3a to TAURUS digitizer |  | 570
PR000403-CBL | MB3a signal cable to integration box |  | 570
PR000404-CBL | MB200x signal cable to integration box |  | 570
PR000405-CBL | Integration Box to digitizer signal cable |  | 570
PR000436-CBL | MB3d serial cable |  | 305

Infrasound sensor

WNRS

Seismic sensor

Digitizer

SPecial offer

MB3a

€8650ex-VAT ex-works

from

for 10 units

order now

Tel. : +33 (0)2 96 46 16 11
marketing@seismowave.com

seismowave.com

manual
Paper Book edition

SW000001-UTI | Technical User Guide for MB3a | 63
SW000002-UTI | Technical User Guide for MB3d | 68
SW000003-UTI | Dionisos User Manual | 73

PR000224-32S | Wind Noise filtering system 32 air-inlet (per 4) | 9250
PR000225- WNR | Air inlets (per 1) | 240
SW000017-WNR | Manifold 8 outputs ( per1) | 460

BOXES

PR000169-EMB | ScrewPack with foam | 137
PR000233-EMB | PELICASE 1430 1 sensor Mb3a or d | 695
PR000198-EMB | PELICASE 1650 6 sensors MB3a or d | 1,525
PR000280-EMB | Flight carrying case 1 MB3a with cables | 695
PR000276-EMB | Flight carrying case 6 MB3a with cables | 1,525

TOOLS

PR000082-CBL | Magnet Adjustment Cable | 265
MU000384-TLS | Magnet Wrench | 65

ACCESSORIES

SW000005-GPS | GPS ANTENNA PROCOM 2000B TNC | 115
SW000006-GPS | Antenna fixing kit | 98
SW000007-GPS | Right Angle Adapter | 99
SW000008-POW | BATTERY NP12-12 YUASA | 115

Services

After sales assistance
hotline warranty



Our team of engineers is available to assist you by phone, team viewer or any other method that suits you best.

INSTALLATION
& TRAINING

Our team organises turnkey station installation projects. This includes measurement system supply and testing, WNRS, civil engineering and data transmission between the sites and the central facilities.
An adapted training plan is designed for each project, taking the trainees’ knowledge and skill level into account.

maintenance

Our team is highly experienced in operating stations, particularly in remote areas with special accesses. We can provide a permanent presence or carry out regular preventive and corrective maintenance visits to maintain the stations in perfect working order.

ASK FOR A QUOTE

metrology  (using IS calibrator©)

Measurement of sensor self noise / sensor
0.02 to 10 HZ | 170
0.01 to 28 Hz | 215
Response by electrical calibration / sensor
0.075 to 10 Hz | 195
0.01 to 28 Hz | 350
Response by acoustical calibration / sensor
0.075 to 10 Hz | 325
0.01 to 28 Hz | 660
Accoustical measurement extra point | 150

+33 (0)2 96 46 16 11
marketing@seismowave.com

Prices in euro tax free ex-works valid december 31th 2017 exept special offers. Non contractual photos and prices